!SBXINP.DEF [102] - Symbols for SBXINP
!-------------------.-------------------.-------------------.-------------------.
!EDIT HISTORY
! VEDIT=102
! Note: history reformatted 9-Feb-17
! [102] 19-Jan-16 / jdm / [102] redefine SXI_DISABLE2, add SXI_READONLY
!       Note: SXI_DISABLE2 was 128 but wasn't documented or referenced
!       explicitly in SBXINP.SBX 2.5(17), so this change only affects
!       application code that may have used the symbol (probably only HGR)
! [101] 01-Jun-15 / jdm / added SXI_DISABLE2 for custom SBXINP.SBX 2.5(016)+
! [100] 19-Nov-06 / jdm / created
!-------------------.-------------------.-------------------.-------------------.

! SBXINP opcodes
define SXI_EDT      = 1     ! edit
define SXI_DSP      = 2     ! display
define SXI_DSPEDT   = 3     ! display and edit
define SXI_DISABLE  = 20    ! add to disable field
define SXI_STATIC   = 30    ! add to display field as a static text control
define SXI_READONLY = 128	! [102] use INFLD |r read-only code 
define SXI_DISABLE2 = 158   ! [101][102] custom variation of disabled field
							! (more readable than the normal disabled style)

